E3(MeV) effective A_y of FPP

4He(p,p) 300MeV

θ_{c.m.} (deg)

NN 200MeV dσ/dΩ(mb/sr) θ_{c.m.} (deg)

A_y

Ay Polarization

θ_{c.m.} (deg)

Q