Apr 25 2005 17:17 Page �

memo_result_deg

memo_result_deg

 input files :
 S-state
 sstate/off50??wa?st7.txt

 P-state
 count_a/off50??sa?t7.txt

 cross section files : r50??t7.crs

 S-state   min   max  w(MeV) cnt  Ex_cnt
 scro0/   5500. 7000. 15.0  362.5 28.556
 scro1/   6200. 7000.  8.0  366.0 25.056
 scro2/   6780. 6920.  1.4  368.5 22.556
 scro3/   6200. 6780.  5.8  364.9 26.156

 P-state(Ex=4.594MeV)
 crspsa0/ 7280. 8780. 15.0  380.3 10.756
 crspsa1/ 8540. 8780.  2.4  386.6  4.456
 crspsa2/ 8540. 8680.  1.4  386.1  4.956
 crspsa3/ 7280. 8540. 12.6  379.1 11.956